-- 同步日志状态字典数据
INSERT INTO system_dict_type (id, name, type, status, remark, creator, create_time, updater, update_time, deleted) VALUES 
(999, '同步日志状态', 'sync_log_status', 0, '同步接口调用日志状态', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0');

INSERT INTO system_dict_data (id, sort, label, value, dict_type, status, color_type, css_class, remark, creator, create_time, updater, update_time, deleted) VALUES 
(9990, 1, '成功', '0', 'sync_log_status', 0, 'success', '', '同步接口调用成功', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0'),
(9991, 2, '解密失败', '1', 'sync_log_status', 0, 'danger', '', '请求解密失败', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0'),
(9992, 3, '签名验证失败', '2', 'sync_log_status', 0, 'warning', '', '签名验证失败', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0'),
(9993, 4, '认证失败', '3', 'sync_log_status', 0, 'warning', '', '用户认证失败', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0'),
(9994, 5, '业务处理失败', '4', 'sync_log_status', 0, 'danger', '', '业务逻辑处理失败', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0'),
(9995, 6, '系统异常', '5', 'sync_log_status', 0, 'danger', '', '系统内部异常', 'admin', '2024-01-01 00:00:00', 'admin', '2024-01-01 00:00:00', b'0');
